SET SERVEROUTPUT ON
SET VERIFY OFF

BEGIN

	FOR i IN 1..32 LOOP
		INSERT INTO Estadistica
		VALUES(i,0,0,0,0,0);
	END LOOP;

END;
/

SET SERVEROUTPUT OFF
SET VERIFY ON